SELECT count() FROM remote('127.0.0.1,localhos', system.one); -- { serverError 198 }
SELECT count() FROM remote('127.0.0.1|localhos', system.one);

-- Clear cache to avoid future errors in the logs
SYSTEM DROP DNS CACHE
