SELECT * FROM (SELECT toInt128(NULL) AS x UNION ALL SELECT materialize(toInt128(-2))) WHERE x; -- { serverError ILLEGAL_TYPE_OF_COLUMN_FOR_FILTER }
SELECT * FROM (SELECT toInt128(NULL) AS x UNION ALL SELECT materialize(toInt128(-2))) WHERE x != 0;
