CREATE TABLE test_max_num_to_warn_1 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_2 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_3 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_4 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_5 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_6 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_7 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_8 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_9 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_10 (id Int32, str String) Engine=Memory;
CREATE TABLE test_max_num_to_warn_11 (id Int32, str String) Engine=Memory;

CREATE DATABASE test_max_num_to_warn_1;
CREATE DATABASE test_max_num_to_warn_2;
CREATE DATABASE test_max_num_to_warn_3;
CREATE DATABASE test_max_num_to_warn_4;
CREATE DATABASE test_max_num_to_warn_5;
CREATE DATABASE test_max_num_to_warn_6;
CREATE DATABASE test_max_num_to_warn_7;
CREATE DATABASE test_max_num_to_warn_8;
CREATE DATABASE test_max_num_to_warn_9;
CREATE DATABASE test_max_num_to_warn_10;
CREATE DATABASE test_max_num_to_warn_11;

INSERT INTO test_max_num_to_warn_1 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_2 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_3 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_4 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_5 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_6 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_7 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_8 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_9 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_10 VALUES (1, 'Hello');
INSERT INTO test_max_num_to_warn_11 VALUES (1, 'Hello');

SELECT * FROM system.warnings where message in ('The number of attached tables is more than 10', 'The number of attached databases is more than 10', 'The number of active parts is more than 10');

DROP TABLE test_max_num_to_warn_1;
DROP TABLE test_max_num_to_warn_2;
DROP TABLE test_max_num_to_warn_3;
DROP TABLE test_max_num_to_warn_4;
DROP TABLE test_max_num_to_warn_5;
DROP TABLE test_max_num_to_warn_6;
DROP TABLE test_max_num_to_warn_7;
DROP TABLE test_max_num_to_warn_8;
DROP TABLE test_max_num_to_warn_9;
DROP TABLE test_max_num_to_warn_10;
DROP TABLE test_max_num_to_warn_11;

DROP DATABASE test_max_num_to_warn_1;
DROP DATABASE test_max_num_to_warn_2;
DROP DATABASE test_max_num_to_warn_3;
DROP DATABASE test_max_num_to_warn_4;
DROP DATABASE test_max_num_to_warn_5;
DROP DATABASE test_max_num_to_warn_6;
DROP DATABASE test_max_num_to_warn_7;
DROP DATABASE test_max_num_to_warn_8;
DROP DATABASE test_max_num_to_warn_9;
DROP DATABASE test_max_num_to_warn_10;
DROP DATABASE test_max_num_to_warn_11;
