set log_queries=1;
set log_queries_min_type='QUERY_FINISH';

set enable_global_with_statement=1;
select /* test=01531, enable_global_with_statement=0 */ 2;
system flush logs;
select count() from system.query_log
where event_time >= now() - interval 5 minute
    and query like '%select /* test=01531, enable_global_with_statement=0 */ 2%'
    and current_database = currentDatabase()
    ;

set enable_global_with_statement=1;
select /* test=01531 enable_global_with_statement=1 */ 2;
system flush logs;
select count() from system.query_log
where event_time >= now() - interval 5 minute
    and query like '%select /* test=01531 enable_global_with_statement=1 */ 2%'
    and current_database = currentDatabase()
    ;
